36-303: Sampling, Surveys and Society Summary of Exam 1

Performance on Exam 1 was very good. A histogram appears in Figure 1, and a summary of the score results follow:

Min. 1st Qu. Median Mean 3rd Qu. Max. 54.00 77.00 82.50 82.53 88.25 98.00

Here are approximate letter grades, using a 90/80/70/60 scale:

Score Letter Count 90–100 A 8 80–89 B 12 70–79 C 13 Other 3 Total 39

Figure 1: Histogram of test scores from Exam 1