                                                                                                                      fitted(mod1)
stdres(mod1)

                                            450 500 550 600 650 700 750

-202

HI

WY
                                                                                                                  ND

Quantiles of Standard Normal

-2 -1 0 1 2

HI

ND

WY

                                                                                                                      fitted(mod2)
stdres(mod2)

                                            500 550 600 650

HI

SD

WY

NY

Quantiles of Standard Normal

-2 -1 0 1 2

HI

WY

SD

NY