                                                                             Fitted : Dlic

Residuals

                                  450 500 550 600 650 700 750

-300

-100

0100200300

                                                                          18

40

50

fits
sqrt(abs(Residuals))

450 500 550 600 650 700 750

51015

18

40

50

Fitted : Dlic

Fuel

450 500 550 600 650 700 750

400500600700800900

                                               Quantiles of Standard Normal

                                        -2 -1 0 1 2

18

40

                                  50

Fitted Values

0.0 0.4 0.8

-200

Residuals

0.0 0.4 0.8

f-value

Index

Cook’s Distance

0 10 20 30 40 50

0.00.10.20.30.4

19

50

40