                                                                                      Index
beta0

                              0 10 20 30 40

-50050

                                                        6

                                                                                        18

                                                                                            20 44

40

                                                                                         19

                                                            7

Index
beta1

0 10 20 30 40

-0.5

0.00.51.01.5

40

19

7

4

18

Index
beta2

0 10 20 30 40

-3-2-1012

6
18

-50050-0.5

0.00.51.01.5-3-2-1012