                             -45 -40 -35 -30 -25 -20 -15

0.00.01

0.03

0.05

                                                                                           b0

4 5 6 7 8

0.00.10.20.30.40.5

b1 b0
b1

-45 -40 -35 -30 -25 -20 -15

4567

                                               Quantiles of Standard Normal
b0

                           -3 -2 -1 0 1 2 3

-45-40-35-30-25-20-15

Quantiles of Standard Normal

-3 -2 -1 0 1 2 3