0 10 20 30 40

4.04.55.05.56.0

10 20

2 4 6 8

Really raw periodogram

frequency spectrum

0.0 0.1 0.2 0.3 0.4 0.5

-20-15-10-5 0

Series: late1 Raw Periodogram

bandwidth= 0.00601405 , 95% C.I. is ( -5.87588 , 17.5667 )dB

10 20

0.00.51.01.52.0

Spectral estimate on natural scale