                                                              Fitted : rad + temp + wind

Residuals

                                        1.5 2.5 3.5 4.5

-2-101

77

                                                                      20

                                                                 17

fits
sqrt(abs(Residuals))

1.5 2.5 3.5 4.5

0.00.40.81.2

77

20

17

Fitted : rad + temp + wind
logoz

1.5 2.5 3.5 4.5

012345

                                                       Quantiles of Standard Normal

                                                         -2 -1 0 1 2

77

20

                                               17

Fitted Values

0.0 0.4 0.8

Residuals

0.0 0.4 0.8

f-value

Index

Cook’s Distance

0 20 40 60 80 100

0.00.10.20.3

20

30

17