                                                        Fitted : ns(E, df = 4) + C

Residuals

                                                       1 2 3 4

-0.6

-0.4

-0.2

0.00.20.4

                                                                                 46

67

                                                                                                               75

fits
sqrt(abs(Residuals))

1 2 3 4

0.20.40.6

46

67

75

Fitted : ns(E, df = 4) + C

NOx

1 2 3 4

1234

                                               Quantiles of Standard Normal

                                            -2 -1 0 1 2

46

67

                                  75

Fitted Values

0.0 0.4 0.8

-1012

Residuals

0.0 0.4 0.8

f-value

Index

Cook’s Distance

0 20 40 60 80

0.00.02

0.04

0.06

0.08

0.10

66

78

24