                                                                          Fitted : NULL

Residuals

                                                  -20 0 20

-10-505

11

                                                                                                             12

                                                   60

fits
sqrt(abs(Residuals))

-20 0 20

0.00.51.01.52.02.53.0

11

12

60

Fitted : NULL

NULL

-20 0 20

-40-2002040

                                               Quantiles of Standard Normal

                                           -2 -1 0 1 2

11

                                             12

                                  60

Fitted Values

0.0 0.4 0.8

-2002040

Residuals

0.0 0.4 0.8

f-value

Index

Cook’s Distance

0 20 40 60

0.00.02

0.06

0.10

23

60

12