                                                                                                    Fitted : First + Second

Deviance Residuals

                                       0 2000 4000 6000 8000

-20010203040

Predicted : First + Second
sqrt(abs(Deviance Residuals))

0 2 4 6 8

123456

                                                                                                    Fitted : First + Second

Resp

                                       0 2000 4000 6000 8000 10000 12000

02000

6000

10000

Quantiles of Standard Normal

Pearson Residuals

-2 -1 0 1 2

-2002040