Time

                             0 10 20 30 40

4.05.06.0

Lutenizing Hormone, Late1 Series

(1:23)/48

10/log(10) * log(Mod(fft(l1.resids)))[2:24]

                                                                                                                    0.1 0.2 0.3 0.4

-402468

Really raw periodogram, detrended

frequency
spectrum

                                     0.0 0.1 0.2 0.3 0.4 0.5

-20-100

Series:  late1

 Raw Periodogram

 bandwidth= 0.00601405 , 95% C.I. is ( -5.87588 , 17.5667 )dB

frequency

                                     0.0 0.1 0.2 0.3 0.4 0.5

-15-10-50

Series:  late1

 Smoothed Periodogram

 bandwidth= 0.0159117 , 95% C.I. is ( -4.16447 , 8.0508 )dB