Time

                                       0 20 40 60

0400

UK Male Data, Detrended and Deseasoned

Lag

                                              0 5 10 15

-0.2

0.40.8

ACF Plot

Lag

                                              0 5 10 15

-0.3

0.00.2

PACF Plot