                                                                             Fitted : diet

Residuals

                                   60 62 64 66

-4-2024

                                                                           20

10

11

fits
sqrt(abs(Residuals))

60 62 64 66

0.51.01.52.0

20

10

11

Fitted : diet
coag

60 62 64 66

606570

                                               Quantiles of Standard Normal

                                -2 -1 0 1 2

20

10

11

Fitted Values

0.0 0.4 0.8

Residuals

0.0 0.4 0.8

f-value

Index

Cook’s Distance

5 10 15 20

0.00.05

0.10

0.15

0.20

10

11

4