                                                                          Fitted : NULL

Residuals

                    -0.010 -0.005 0.0 0.005 0.010

-4-202

                                                                                               2

                                                                                               1

fits
sqrt(abs(Residuals))

-0.010 -0.005 0.0 0.005 0.010

1.71.81.92.02.12.22.3

2

1

Fitted : NULL

NULL

-0.010 -0.005 0.0 0.005 0.010

                                               Quantiles of Standard Normal

                           -0.6 -0.2 0.0 0.2 0.4 0.6

2

                                  1

Fitted Values

0.3 0.5 0.7

Residuals

0.3 0.5 0.7

f-value